)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3 3.5 4

± / Background e ± Inclusive e

0 1 2 3 4 5 | < 0.8 y = 13 TeV, | s pp,

ALICE Preliminary

ALI-PREL-133161

ALI-PREL-133161