(GeV/c) Tp 0 2 4 6 8 10 12 14

pPb Q

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 ALICE preliminary -μ^+μ→ψ Inclusive J/ < -2.96, 2-10% cmsy

= 8.16 TeV, -4.46 < NNs Pb −p

EPS09s NLO + CEM (Vogt et al., PRC 87 (2012) 054910) Energy loss (Arleo et al., JHEP 10 (2014) 073)

ALI-PREL-150281

ALI-PREL-150281