)c (GeV/ Tp 0 2 4 6 8 10 12 14

pPb Q

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 ALICE preliminary -μ^+μ→ψ Inclusive J/

< 3.53 cmsy

= 8.16 TeV, 2.03 < NNs Pb −p

2-10% 10-20% 20-40% 40-60% 60-80% 80-90%

ALI-PREL-147262

ALI-PREL-147262