)c (GeV/ Tp 0 1 2 3 4 5 6

-1)c

) (GeV/ y d_Tp/(d N^2 d_{ev}N1/

4−10

3−10

2−10

1−10

1

10

210

3 2×

0-10% ^2 2×

10-30% 1 2×

30-60% ^0 2×

60-90%

+ Ξ+^-Ξ

ALICE Preliminary = 5.44 TeV NNs Xe-Xe

Blast-Wave fit

ALI-PREL-160212

ALI-PREL-160212