-1)c (GeV/ Tp /dyd

N^2 d evtN 1/

-7 10 -6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10 210 310 410 = 7 TeV s ALICE Preliminary, pp

V0M Class I+II 100 ×π 50 ×K p 10 × _S^0K 0.1 ×Λ 0.05 ×Ξ 0.05

×Ω_{-5} 10 × K*

, K, p π Blast-Wave fit to Blast-Wave prediction

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 πc fit range: 0.5-1.0 GeV/

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 K c 0.2-1.5 GeV/

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 pc 0.3-3.0 GeV/

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5_S0K

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 Λ

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 Ξ

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 Ω

)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9 1 1.5 K*

ALI-PREL-109116

ALI-PREL-109116