〉_Tβ〈 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

(GeV) kinT

0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2

)c ) , p (0.3-3.0 GeV/ c ) , K (0.2-1.5 GeV/ c (0.5-1 GeV/ π Global Blast-Wave fit to = 7 TeV s ALICE Preliminary, pp, = 5.02 TeV s ALICE, p-Pb, = 2.76 TeV s ALICE, Pb-Pb,

ALI-PREL-108835

ALI-PREL-108835