0

100

200

300

400

500

Lifetime (ps)

PR 136 (1964) B1803

PRL 20 (1968) 819 PR 180 (1969) 1307

NPB 16 (1970) 46

PRD 1 (1970) 66 NPB 67 (1973) 269

Science 328 (2010) 58

NPA 913 (2013) 170 PLB 754 (2016) 360 PRC 97 (2018) 054909

PLB 797 (2019) 134905

ALICE Preliminary

lifetime - PDG value Λ H average lifetime Λ 3

Theoretical prediction , PRC 57 (1998) 1595 et al.

H. Kamada R.H. Dalitz, M. Rayet, Nuo. Cim. 46 (1966) 786 J. G. Congleton, J. Phys G Nucl. Part. Phys. 18 (1992) 339 A. Gal, H. Garcilazo, PLB 791 (2019) 48-53

ALI-PREL-342079

ALI-PREL-342079