)c (GeV/ Tp 0 5 10 15 20 25 30 35

)^0(D_Tp/dσ) / d +(D_Tp/dσd

0.2 0.4 0.6 0.8 1 1.2 1.4

2.7% BR uncertainty (not shown) ±

stat. unc. syst. unc. FONLL

ALICE Preliminary = 13 TeV s , pp, 0 / D +D | < 0.5 y|

ALI-PREL-131077

ALI-PREL-131077