(TeV) s 0 2 4 6 8 10 12 14

(mb) σ

0 0.2 0.4 0.6 0.8 1^{Data}_{PYTHIA8}

PHOJET

ALICE Preliminary c < 5 GeV/ Tp 1.5 < < 4 y 2.5 < pp

μμ→ϕ

ALI-PREL-147918

ALI-PREL-147918