0 0.2 0.4 0.6 0.8 1 1.2 1.4

)^2c

(dimuons per 25 MeV/

-μ^+μM

dN/d

0

0.2

0.4

0.6 610 × ALICE Preliminary = 13 TeV s pp c < 10 GeV/ Tp 1 < < 4 y 2.5 < γμμ →η μμ →η

μμ →ω

μμ →ϕ μμ →ρ

γμμ →'η

0πμμ →ω correlated continuum

)^2c

(GeV/

-μ^+μM

0 0.2 0.4 0.6 0.8 1 1.2 1.4

Data/MC

0.8 1 1.2

ALI-PREL-148540

ALI-PREL-148540