)c (GeV/ Tp

AA R

2 4 6 8 10

0.5

1 0-5%

ALICE Preliminary

Pb-Pb, = 5.02 TeV (filled markers) NNs ALICE, PRC93 034913 (2016) = 2.76 TeV (empty markers) NNs

2 4 6 8 10

0.5

1 5-10% - + K +K

2 4 6 8 10

0.5

1 10-20%

0 2 4 6 8 10

0.5

1 20-40%

2 4 6 8 10

0.5

1 40-60%

2 4 6 8 10

0.5

1 60-80%

ALI-PREL-125091

ALI-PREL-125091