)c (GeV/ Tp Forward

0.4 0.6 0.8 1

)c (GeV/

〉_Tp〈 Backward

0.6

0.65

0.7

70-75%

50-55%

30-35%

0-5%

ALICE Preliminary = 2.76 TeV NNs Pb-Pb c < 2.0 GeV/ Tp 0.2 < =0.4 ηδ =0.8, gapη

ALI-PREL-136658

ALI-PREL-136658