fhistoInvMass__1__1__1__1__1__1__1__1 Entries 58 Mean 0.1482 RMS 0.003709

)^2c

) (GeV/ π ) - M(K ππ M(K 0.14 0.145 0.15

)^2c Entries / (1.1 MeV/

0

20

40

60

80

100

2c 0.28) MeV/ ± = (145.24 μ 2c 0.25) MeV/ ± = (0.91 σ

1.1 ± ) = 3.7 σ Significance(3 18 ± ) = 55 σ S(3 c < 2 GeV/ Tp = 8 TeV, 1 < s , pp, *+D ALICE Preliminary^{fhistoInvMass__2__2__2__2__2__2__2__2}Entries 116_{Mean 0.1468RMS 0.003264}

)^2c

) (GeV/ π ) - M(K ππ M(K 0.14 0.145 0.15

)^2c

Entries / (0.55 MeV/

0 10 20 30 40 50 60 70 80 90 fhistoInvMass__2__2__2__2__2__2__2__2

Entries 116 Mean 0.1468 RMS 0.003264 2c 0.09) MeV/ ± = (145.47 μ 2c 0.07) MeV/ ± = (0.63 σ

0.7 ± ) = 8.3 σ Significance(3 12 ± ) = 96 σ S(3 c < 6 GeV/ Tp 5 <

fhistoInvMass__3__3__3__3__3__3__3__3 Entries 87 Mean 0.1463 RMS 0.002929

)^2c

) (GeV/ π ) - M(K ππ M(K 0.14 0.145 0.15

)^2c

Entries / (0.65 MeV/

0

5

10

15

20

25

30

2c 0.16) MeV/ ± = (145.34 μ 2c 0.17) MeV/ ± = (0.71 σ

0.6 ± ) = 5.0 σ Significance(3 7± ) = 30 σ S(3 c < 24 GeV/ Tp 16 <

ALI-PREL-110185

ALI-PREL-110185