fhistoInvMass__1__1__1__1__1__1__1__1__1

Entries 51 Mean 1.895 RMS 0.09818

)^2c

)(GeV/ ππ M(K 1.75 1.8 1.85 1.9 1.95 2 2.05

)^2c Entries / (7 MeV/

0

20

40

60

80

100

2c 0.002) GeV/ ± = (1.867 μ_2 c 0.002) GeV/ ± = (0.007 σ

0.9 ± ) = 4.4 σ Significance(3 16 ± ) = 64 σ S(3 c < 2 GeV/ Tp = 8 TeV, 1 < s , pp, +D ALICE Preliminary_{fhistoInvMass__2__2__2__2__2__2__2__2__2Entries 34}

Mean 1.846 RMS 0.08863

)^2c

)(GeV/ ππ M(K 1.75 1.8 1.85 1.9 1.95 2 2.05

)^2c

Entries / (11 MeV/

0

50

100

150

200

250 fhistoInvMass__2__2__2__2__2__2__2__2__2

Entries 34 2c 0.001) GeV/ ± = (1.869 μ_2 c 0.001) GeV/ ± = (0.010 σ

0.6 ± ) = 12.9 σ Significance(3 19 ± ) = 255 σ S(3 c < 6 GeV/ Tp 5 <

fhistoInvMass__3__3__3__3__3__3__3__3__3

Entries 34 Mean 1.878 RMS 0.0843

)^2c

)(GeV/ ππ M(K 1.75 1.8 1.85 1.9 1.95 2 2.05

)^2c

Entries / (11 MeV/

0 5 10 15 20 25^{fhistoInvMass__3__3__3__3__3__3__3__3__3} 2c 0.004) GeV/ ± = (1.869 μ_2 c 0.004) GeV/ ± = (0.016 σ

0.7 ± ) = 4.9 σ Significance(3 8± ) = 39 σ S(3 c < 24 GeV/ Tp 16 <

ALI-PREL-110181

ALI-PREL-110181