0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 )^2c

(GeV/ eem 2−10

1−10 1 10 210 310 410 510 610

S/B Statistical significance

ALICE Preliminary

= 5.02 TeV NNs p-Pb | < 0.8 eη, |c

< 20 GeV/

T,ep

0.2 < c < 8 GeV/

T,ee p

ALI-PREL-329818

ALI-PREL-329818