0.8 - 0.6- 0.4- 0.2- 0 0.2 0.4 0.6 0.8 MVA Output

3-10

2-10

1-10

Yield (arb. units)

ALICE Performance

= 5.02 TeV NNs p-Pb | < 0.8 η, |c

< 5 GeV/ Tp 0.2 <

Data Monte Carlo Electrons Pions Protons Kaons

20 40 60 80 100 120 140 160 180 200 220

0.8 - 0.6- 0.4- 0.2- 0 0.2 0.4 0.6 0.8

MVA Output 0 0.5 1 1.5

MC/Data

ALI-PERF-149514

ALI-PERF-149514