1.2 1.4 1.6 1.8 2 2.2 2.4 )^2c

(GeV/

-π^+π^-π^+πm 20− 0 20 40 60 80 100 120 140

))^2c ) (mb/(GeV/ mdy /(d σ^2 d× BR

-π^+π^-π^+π

Pb + Pb + → ALICE, Pb + Pb | < 0.5 -π^+π^-π^+πy

= 5.02 TeV, | NNs Total (1450) ρ (1700) ρ production π Non-resonant 4 (1700) interference ρ (1450)- ρ interference π (1450)-4 ρ interference π (1700)-4 ρ

/ndf = 13 / 19 2χ Prob = 84 % →

ALI-PUB-618581

ALI-PUB-618581