)c (GeV/ Tp 0 2 4 6 8

| > 0.9} ηΔ {SP,| 2v

0

0.1

0.2

0.3

0.4 Centrality: 10-20%

)c (GeV/ Tp 0 2 4 6 8

| > 0.9} ηΔ {SP,| 2v

0

0.1

0.2

0.3

0.4 Centrality: 30-40%

0

0.2

0.4

0.6

0.8

1 ALICE Preliminary = 5.02 TeV NNs Pb-Pb |y| < 0.5 ±π ± K p p+ ϕ

0 S K Λ+Λ + Ξ+^-Ξ + Ω+^-Ω

ALI-PREL-147841

ALI-PREL-147841