2.5 3 3.5 4 4.5 )^2c

(GeV/ μμm

10 210 310 410 510 610

2c Counts per 30 MeV/

3.4 3.6 3.8 4 4.2 )^2c

(GeV/ μμm

1 2 3 310×

2c Counts per 30 MeV/

= 8.16 TeV NNs Pb, − ALICE, p < 3.53 cms y 2.03 <

Total Fit ψJ/ (2S) ψ Background

ALI-PUB-564290

ALI-PUB-564290