0 2 4 6_{NSD} |<1 η |_{〉η / dchNd〈}^{η / dchNd} 0

0.5

1

1.5

2

NSD 〉_{)ψ(J/N}〈^{)ψ(J/N}/〉_{(2S))ψ(N}〈^{(2S))ψ(N}

= 8.16 TeV NNs Pb − ALICE, p

< -2.96 cms y -4.46 <

-μ ^+μ→

(2S) ψ,ψJ/ Data Comover

ALI-PUB-564330

ALI-PUB-564330