0 20 40 60 〉η/d_{ch}Nd〈 0

0.02

0.04

0.06

{2} 2v

< -2.5 η -3.1 < < 0 η -0.8 < < 0.8 η 0 <

< 3.1 η 2.5 < < 4.8 η 3.8 <

ALICE = 5.02 TeV NNs Pb −p c > 0 GeV/ Tp Peripheral Sub.

ALI-PUB-569354

ALI-PUB-569354