5− 0 5 η 0

0.05

0.1

{2} 2v

ALICE c

> 0 GeV/ Tp = 2.76 TeV NNs Pb − 70% (V0M) Pb − 60 {2,QC} 2 subv = 2.76 TeV NNs Pb − 80% (V0M) Pb − 70 {2,QC} 2 subv Pb− 5% (V0A) p − 0 {2,ITF} 2v Pb− 5% (V0A) p − 0 {2,Peri. sub.} 2v

ALI-PUB-569362

ALI-PUB-569362