0 0.02 0.04 0.06 0.08 0.1 )c (GeV/ k* 0.4

0.6

0.8

1

)k*(C

= 5.02 TeV NNs Pb −Pb 10 % − , 0 d^−π⊕d ^+π Systematic uncertainty = 12.6 fm R Lednicky fit,

Preliminary

ALICE

ALI-PREL-504059

ALI-PREL-504059