0 0.02 0.04 0.06 0.08 )c (GeV/ k*

1

1.2

1.4

1.6

)k*(C

= 5.02 TeV NNs Pb −Pb 30 % − d, 10 −π⊕d^+π Systematic uncertainty Lednicky fit

Preliminary

ALICE

Lednicky functions, radii [1] thermal deuterons coalescence deuterons

[1] Mrowczynski, Acta Phys. Pol. B 51, 1739 (2020)

ALI-PREL-504087

ALI-PREL-504087