)^2c

(GeV/ inv m

Counts

50

100

150

200

250

300^310×

data combined fit signal (Breit-Wigner) ϕ background (pol2)

ALICE Preliminary

= 5.02 TeV NNs p-Pb 0-20% (V0A) c < 2 GeV/ Tp | < 0.8, 1.5 < η|

- + K + K →ϕ

)^2c

(GeV/

-K^+Km

1 1.01 1.02 1.03 1.04 1.05 1.06

|>0.8} ηΔ {2,| tot 2 v

0.08 0.1 0.12

0.14

0.16

0.18

fit tot 2v

ALI-PREL-132612

ALI-PREL-132612