20 30 40^210^210×2^310 (GeV)

Pb,n γW 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Ratio

= 5.02 TeV NNs Pb − ALICE, UPC Pb 2 | < 0.36) GeV t /(0.09 < | 2 | < 0.81) GeV t (0.36 < | 2 | < 0.36) GeV t /(0.09 < | 2 | < 1.44) GeV t (0.81 < |

ALI-PUB-593307

ALI-PUB-593307