20 30 40^210^210×2^310

(GeV)

Pb,n γW 1

10

210

) ^2 b/GeV μ | (t Pb)/d| ψ J → Pbγ(σd

2 | < 0.36) GeV t (0.09 < |_2

| < 0.81) GeV t (0.36 < |_2

| < 1.44) GeV t (0.81 < |

= 5.02 TeV NNs Pb − ALICE, UPC Pb

ALI-PUB-593303

ALI-PUB-593303