0 5 10 15 20

(TeV) ZNC E 0

100

200

300

400

500

counts/(0.2 TeV)

ALICE = 5.02 TeV NNs Pb −Pb No signal in ZEMs 1 proton in ZPC

0 5 10 15 20

(TeV) ZNA E 0

100

200

300

400

500

counts/(0.2 TeV)

ALICE

Data

Fit, total

3n, 4n, 5n

Fit, 1n, 2n,

= 5.02 TeV NNs Pb −Pb No signal in ZEMs 1 proton in ZPA

ALI-PUB-606622

ALI-PUB-606622