2.29 2.36 2.44 2.51 2.58 2.65

)^2c

) (GeV/ πΞ(M

0.5

0.6

0.7

0.8

0.9

1

1.1^310×

2c Counts per 8 MeV/

Total fit function

Combinatorial Background

ALICE Preliminary^+π^−Ξ→ ^0_cΞ and charge conj.

= 13.6 TeV spp,_{-1} 3.6 pb

= _{int}L c

< 6 GeV/ Tp 5 <

FT0M

70-100 %

ALI-PREL-636085

ALI-PREL-636085