y 1− 0.8− 0.6− 0.4− 0.2− 0 0.2 0.4 0.6 0.8 1

(nb) y/dσd

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 ALICE Preliminary = 13 TeV s pp, | < 0.6 y), | c < 60 GeV/

T,ep

(30 < + W ← ^+e

Data Syst. Unc. (data) POWHEG (CT10nlo) + PYTHIA6

5.4% lumi. uncertainty not shown ±

ALI-PREL-486936

ALI-PREL-486936