1.8 1.85 1.9 1.95 2 2.05 2.1 )^2c

) (GeV/ π (KK M 0.0

0.2

0.4

0.6 0.8

1.0

1.2 310 ×

2c Counts per 8 MeV/

ALICE = 5.02 TeV NNs Pb, − 10% Pb −0 and charge conj.

+π^−K^+ K

→ ^+πϕ→ ^+_sD c < 6 GeV/ Tp 4 <

2c 1) MeV/ ± = (1971 μ 73 ± S = 789 2c = 10 MeV/ σ 0.06 (syst.) ± 0.03 (stat.) ± = 0.73

non-prompt f

ALI-PUB-564046

ALI-PUB-564046