2 4 6 8 10 12 14 16 18 20

|<0.5

η|〉η/d_{ch}Nd〈

0.04

0.06

0.08

0.1

0.12

0.14

Λ (1520)/ Λ

ALICE Preliminary

Uncertainties: stat. (bar), sys. (box)

= 5.02 TeV s , pp Λ (1520)/ Λ = 13 TeV s , pp Λ (1520)/ Λ

ALI-PREL-503850

ALI-PREL-503850