1.45 1.5 1.55 1.6 1.65

)^2c

(GeV/ pKM 4 5 6 7 8 9 10 11 310 ×

)^2c Counts/(5 MeV/

ALICE Performance 0 - 10% = 5.02 TeV, |y|< 0.5 s pp, + cc. - pK → (1520) Λ )< 2.5 c (GeV/ Tp 2.0 < Same Event Mixed Events Background

ALI-PERF-503463

ALI-PERF-503463