1 2 3 4 5 6 )c (GeV/ Tp

6−10

5−10

4−10

3−10

2−10

1−10

-1)c ) (GeV/ yd_Tp/(d N^2 d Evt N1/

V0M Multiplicity percentile(%) 0-10 10-30 30-50 50-70 70-100

ALICE Preliminary

| < 0.5 y = 13 TeV, | s pp,

(1520) Λ

Uncertanities: stat.(bars), syst.(boxes)

1 2 3 4 5 6 )c (GeV/ Tp

1−10

1

10

Ratio to 0-100%

ALI-PREL-503447

ALI-PREL-503447