)^2c

(GeV/ KK M 1 1.05 1.1

)^2c

Counts / (0.001 GeV/

0.0

0.5

1.0

310 × ALICE Preliminary

= 8.16 TeV (0-100%) NNs p-Pb - K^+ K →ϕ < 0 y -0.5 < c < 0.8 GeV/ Tp≤ 0.6 Data (stat. uncert.) Voigtian Peak Fit Residual BG

ALI-PREL-144974

ALI-PREL-144974