)c (GeV/ Tp 0 2 4 6 8 10 12 14

-1)c ) (GeV/ yd_Tp/(d

N^2 d

INEL N1/

6−10

5−10

4−10

3−10

2−10

1−10 )/2^-

+ K* + (K* )/2 0*K + ^0 (K* | < 0.5 y = 8 TeV (INEL), | s pp

ALICE Preliminary

Uncertainties: stat. (bar), sys. (box)

Normalization uncertainty: 2.95%

)c (GeV/ Tp 0 2 4 6 8 10 12 14

0 /K* ±K*

0.5 1 1.5

ALI-PREL-145804

ALI-PREL-145804