1.29 1.3 1.31 1.32 1.33 1.34 1.35 1.36 1.37 1.38

)^2c

) (GeV/ +πΛ(M

10

210

310

410

510

Counts

= 13 TeV s ALICE, pp Data Signal + background Background 2c 0.015 MeV/ ± = 1321.969 μ 2c 0.018 MeV/ ± = 1.693 σ

< 0.8 dauη

< 0.5 ; 0 < y 0 < c < 5 GeV/ Tp 2.4 < + Ξ

ALI-PUB-635949

ALI-PUB-635949