1.63 1.64 1.65 1.66 1.67 1.68 1.69 1.7 1.71 1.72

)^2c

) (GeV/

+KΛ(M 10

210

310

410

Counts

= 13 TeV s ALICE, pp Data Signal + background Background 2c 0.019 MeV/ ± = 1672.624 μ 2c 0.024 MeV/ ± = 1.739 σ

< 0.8 dauη

< 0.5 ; 0 < y 0 < c < 5 GeV/ Tp 1.4 < + Ω

ALI-PUB-635957

ALI-PUB-635957