0 2 4 6 8 10 12 14 )c (GeV/ Tp 0.1 − 0 0.1 0.2 0.3 0.4 0.5

2v

Stat. Uncert. Syst. Uncert.

= 5.36 TeV NNs Pb, − ALICE Preliminary, Pb 60% − < 4, 5 y , 2.5 <

-μ^+μ → (1S) ϒ Blast-wave description f0τ ) = const. = r(_fτ )r (1 + 0.5 f0τ ) = r(_fτ )r (1 - 0.5 f0τ ) = r(_fτ

ALI-PREL-600795

ALI-PREL-600795