counts per 40 MeV

1.5 2 2.5 3 3.5 4

2 Counts per 40 MeV/c

200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400 ALICE Preliminary = 5.02 TeV NNs Pb-Pb,

N Events: 14.98 M

Centrality: 40-60 % Opposite sign EM

Bkg scaled in: 1.5- 2.5, 3.2- 4.2 2c < 3.16 GeV/

-e^+em

2.92 <

)^2c

(GeV/

-e^+em

1.5 2 2.5 3 3.5 4

2c Counts per 40 MeV/

100 − 0 100 200 300 400 OS-EM MC 92 ± : 829 ψJ/N

0.012 ± S/B: 0.109 1.0 ± : 9.0 S+B S/

ALI-PREL-118495

ALI-PREL-118495