)c (GeV/ Tp 0 2 4 6 8 10 12 14 16 18 20

pPb R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

= 8.16 TeV NNs p-Pb = 5.02 TeV (JHEP 06 (2015) 055) NNs p-Pb

ALICE 2.96

- < cmsy

4.46 < -,ψ Inclusive J/

ALI-PUB-157555

ALI-PUB-157555