)^2c

(GeV/ μμm 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 4.2

2c Counts per 50 MeV/

10000

20000

30000

40000

50000

60000

70000

80000

90000

= 1.4

)σ3±( S/B

= 8.16 TeV NNs p-Pb,

ALICE

2.96

- < cms y 4.46 < -

ALI-PUB-157527

ALI-PUB-157527