)^2c

(GeV/ μμm 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 4.2

2c Counts per 50 MeV/

0

20

40

60

80

100 ALICE = 5.44 TeV NNs 0-90% Xe-Xe,

ALI-PUB-156966

ALI-PUB-156966