)c (GeV/ Tp 1-10 1 10

Ratio to combined spectrum

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

Combined ITSsa TOF TPC Kinks HMPID

MB -+K +K ALICE Preliminary = 5.02 TeV s pp

ALI-PREL-145657

ALI-PREL-145657