(GeV) NNs 10^210^310 p) Δ (_2/C_4C

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 p p = p -

Δ ALICE Preliminary c < 1.0 GeV/ Tp 0.4 <

| < 0.8 η| Pb-Pb (0 - 10%)

STAR^{[PRL 112, 032302 (2014)]} Au-Au (0 - 5%) c < 0.8 GeV/ Tp 0.4 <

|y| < 0.5 Boxes: sys. errors

ALI-PREL-159602

ALI-PREL-159602