0 0.2 0.4 0.6 0.8 1 1.2 )c (GeV/ Tp 0 10 20 30 40 50 60 70 80 90 100

)c Dimuon counts / (40 MeV/

ALICE

= 8.16 TeV NNs Pb −p < 4.0 y 2.5 < 2c < 3.5 GeV/ μμM 2.5 < Sum ψ Exclusive J/ Pbγ from ψJ/ γγ Exclusive Non-exclusive bkg.

ALI-PUB-568466

ALI-PUB-568466