0.25 0.3 0.35 0.4 0.45 0.5 0.55 )c (GeV/ Tk 0.005 −

0

0.005

0.01

0.015

0.02

invλ

ALICE Preliminary = 5.02 TeV NNs Pb, −Pb correlation

PHOS

γ - PCM γ 0-10% 30-50%

ALI-PREL-504794

ALI-PREL-504794