|<0.5

η|〉η/d_{ch}Nd〈

0 200 400 600 800 1000 1200 1400 1600 1800 2000

)p He / (p + 32

0 2 4 6 8 10 12 14^{6-}10×

ALICE Pb-Pb

= 5.02 TeV, Preliminary NNs = 2.76 TeV, PRC 93 (2016) 2, 024917 NNs

ALI-PREL-265657

ALI-PREL-265657