(GeV/c) Tp 0 2 4 6 8 10 12 14 16 18 20

(pb/GeV/c)

Tp/d HF ←μσd

1 10 210 3 10 410 5 10 6 10 710 8 10 9 10 <3.1 y 2.8<

(GeV/c) Tp 0 2 4 6 8 10 12 14 16 18 20

(pb/GeV/c)

Tp/d HF ←μσd

1 10 210 3 10 410 5 10 6 10 710 8 10 9 10 <2.8 y 2.5<

(GeV/c) T p 0 2 4 6 8 10 12 14 16 18 20

(pb/GeV/c) T p/d HF ←μσd

1 10 210 3 10 410 5 10 6 10 710 8 10 9 10 <3.7 y 3.4<

(GeV/c) Tp 0 2 4 6 8 10 12 14 16 18 20

(pb/GeV/c)

Tp/d HF ←μσd

1 10 210 3 10 410 5 10 6 10 710 8 10 9 10 <3.4 y 3.1<

HF, FONLL

← ^±μ

charm, FONLL

← ^±μ

beauty, FONLL

← ^±μ data ALICE Preliminary

=8 TeV s pp, 3% normalization uncertainty not included

(GeV/c) Tp 0 2 4 6 8 10 12 14 16 18 20

(pb/GeV/c)

Tp/d HF ←μσd

1 10 210 3 10 410 5 10 6 10 710 8 10 9 10 <4.0 y 3.7<

ALI-PREL-135648

ALI-PREL-135648