0 2 4 y 0

0.5

1

AA R

−μ^+μ → (1S) ϒ = 5.02 TeV NNs Pb-Pb

ALICE, Cent. 0-90% (arXiv:1805.04387) CMS, Cent. 0-100% (arXiv:1805.09215)

ALI-PREL-307082

ALI-PREL-307082